5310 5315 5320

(Angstroms) 0.9

1

1.1

1.2

1.3

1.4

FeII 5317

6670 6675 6680 6685

(Angstroms) 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

Relative Flux

HeI 6678

4850 4860 4870 0.4

0.6

0.8

1

1.2

1.4

H 4481

6550 6560 6570 0 0.5 1 1.5 2 2.5 3 3.5

Relative Flux

H 6562